tge.exe +RTS -s -p -hc 780,604,998 bytes x seconds Tue Feb 10 22:59 2015

seconds

0.0 2.0 4.0 6.0 8.0 10.0 bytes

0M

20M

40M

60M

80M

100M

120M

140M

160M

(181)freeNearbyCells.north...

(183)freeNearbyCells.west/...

(178)freeNearbyCells.east/...

(166)freeNearbyCells.south...

...

(147)createMorePaths/bfsSh...